[tex26] Positive and negative heat capacities

The p−V diagram shows an isotherm and an adiabate for the classical ideal gas. Show that a quasistatic process of the type 1 → 2 is characterized by a positive heat capacity and a process of the type 3 → 4 by a negative heat capacity.