[tex53]Structural transitions of iron

At constant atmospheric pressure, the stable phase of Fe below 900^∘C and above 1400^∘C is α-iron. Between these temperatures, the stable phase is γ-iron. The specific heat of each phase can be taken as constant: c_α = 0.775J/gK, c_γ = 0.690J/gK. Find the latent heat (per gram) at each of the two phase transitions.